import React from 'react';
import { Stack, Text, NumberInput, Slider } from '@mantine/core';
import { useTranslation } from 'react-i18next';
import { ConvertParameters } from '../../../hooks/tools/convert/useConvertParameters';

interface ConvertFromWebSettingsProps {
  parameters: ConvertParameters;
  onParameterChange: <K extends keyof ConvertParameters>(key: K, value: ConvertParameters[K]) => void;
  disabled?: boolean;
}

const ConvertFromWebSettings = ({
  parameters,
  onParameterChange,
  disabled = false
}: ConvertFromWebSettingsProps) => {
  const { t } = useTranslation();

  return (
    <Stack gap="sm" data-testid="web-settings">
      <Text size="sm" fw={500}>{t("convert.webOptions", "Web to PDF Options")}:</Text>

      <Stack gap="xs">
        <Text size="xs" fw={500}>{t("convert.zoomLevel", "Zoom Level")}:</Text>
        <NumberInput
          value={parameters.htmlOptions.zoomLevel}
          onChange={(value) => onParameterChange('htmlOptions', {
            ...parameters.htmlOptions,
            zoomLevel: Number(value) || 1.0
          })}
          min={0.1}
          max={3.0}
          step={0.1}
          disabled={disabled}
          data-testid="zoom-level-input"
        />
        <Slider
          value={parameters.htmlOptions.zoomLevel}
          onChange={(value) => onParameterChange('htmlOptions', {
            ...parameters.htmlOptions,
            zoomLevel: value
          })}
          min={0.1}
          max={3.0}
          step={0.1}
          disabled={disabled}
          data-testid="zoom-level-slider"
        />
      </Stack>
    </Stack>
  );
};

export default ConvertFromWebSettings;
